;
; warpin_emx.def:
;       different module definition file for use with
;       EMX, because EMX doesn't know the prototypes
;       listed below.

NAME WARPIN WINDOWAPI

Description '@#OS/2 Netlabs:1.0.21#@ WarpIN installer (EMX)'

STACKSIZE   65536

IMPORTS
    DosReplaceModule = DOSCALLS.417
    DosQProcStatus = DOSCALLS.154
    DOS16SIZESEG = DOSCALLS.126
    DOSQUERYMODFROMEIP = DOSCALLS.360

